Title: PCDS - CGM Modules - Module 3

Q1

Q: What is the target time in range for a person without frailty?
- >50%
- >65%
- >70% (correct)
- >90%
Feedback (0 to 90%): Unfortunately that isn’t the right answer – please try again
Feedback (91 to 100%): Correct

Q2

Q: How long must a sensor have been active for the data to be valid?
- 90% of the time for 24 hours or more
- 70% of the time, for 7 days or more
- 85% of the time, for 7 days or more
- 70% of the time, for 14 days or more (correct)
- 90% of the time, for 14 days or more
Feedback (0 to 90%): Unfortunately that isn’t the right answer – please try again
Feedback (91 to 100%): Correct

Choose the correct statement.